\documentclass[11pt]{article}
% Custimize your packages here:
\usepackage[dvips]{graphicx}
\usepackage{pstricks,pst-slpe,pst-grad}
\usepackage{amssymb,boxdims}
%\usepackage{jda}
%\usepackage{mtgreek} \italicupcasegreek
%
\addtolength{\textwidth}{2cm}
\addtolength{\textheight}{3cm}
\setlength{\oddsidemargin}{0pt}
\setlength{\evensidemargin}{0pt}
\setlength{\hoffset}{-0.5in}
\newbox\graph
\pagestyle{empty}
\thispagestyle{empty}
%
\begin{document}
  \noindent\vspace{2ex}\input{test.tex}\box\graph
\end{document}
